From 752f08efe7050f6476ae2f76f1c986fa8cd698e9 Mon Sep 17 00:00:00 2001
From: Patrick Vacek <patrickvacek@gmail.com>
Date: Tue, 30 Jul 2019 10:53:34 +0200
Subject: README: fix type in recipe name.

Signed-off-by: Patrick Vacek <patrickvacek@gmail.com>
Suggested-by: Montgomery, Greg <greg.montgomery@here.com>
(cherry-picked from commit 924a190936f24eb9978e66c8a9e44c2d5873f2a4)
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 9c125bf..8bded9a 100644
--- a/README.adoc
+++ b/README.adoc
@@ -112,7 +112,7 @@ Your images will also need network connectivity to be able to reach an actual OT
 * `SOTA_SECONDARY_CONFIG` - a file containing JSON configuration for secondaries. It will be installed into `/etc/sota/ecus` on the device and automatically provided to aktualizr. See link:https://github.com/advancedtelematic/aktualizr/blob/master/docs/posix-secondaries-bitbaking.adoc[here] for more details.
 * `SOTA_HARDWARE_ID` - a custom hardware ID that will be written to the aktualizr config. Defaults to MACHINE if not set.
 * `RESOURCE_xxx_pn-aktualizr` - controls maximum resource usage of the aktualizr service, when `aktualizr-resource-control` is installed on the image. See <<aktualizr service resource control>> for details.
-* `SOTA_POLLING_SEC` - sets polling interval for aktualizr to check for updates if aktualizr-polling-sec is included in the image.
+* `SOTA_POLLING_SEC` - sets polling interval for aktualizr to check for updates if aktualizr-polling-interval is included in the image.
 
 == Usage
 
-- 
cgit v1.2.3-54-g00ecf

