From 95e2f81a149142b67076a3132e1b00d9f64bd031 Mon Sep 17 00:00:00 2001
From: Patrick Vacek <patrickvacek@gmail.com>
Date: Tue, 7 Nov 2017 15:25:21 +0100
Subject: Rename for accuracy.

---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 0097670..b4608d5 100644
--- a/README.adoc
+++ b/README.adoc
@@ -136,5 +136,5 @@ SANITY_TESTED_DISTROS=""
 * Run oe-selftest:
 
 ```
-oe-selftest --run-tests garage_push
+oe-selftest --run-tests updater
 ```
-- 
cgit v1.2.3-54-g00ecf

